= Eduard XVII — The loyal MUC servant

== Continuous Integration

We currently use the CI of Gitlab.com, but it might be warranted to use a
dedicated runner which could execute the requests much faster. This is work
for Future Homer.

Currently everything is configured in the file `.gitlab-ci.yml`:

[source,yaml]
----
include::../../../.gitlab-ci.yml[]
----

NOTE: Replacing `ec.SunEC` is done here because there were problems in the
      Docker container with OpenJDK. Apparently making a HTTPS connection
      to the Gradle repositories would not work.